γN 0 20 40 60 80 100 120 140

)_γN P (

5−10

4−10

3−10

2−10

1−10

ALICE

Double NBD fit

ALICE NSD = 5.02 TeV NNs Pb, −p < 3.9 labη

2.3 <

γN 0 20 40 60 80 100 120 140

Ratio to fit

0.5 1 1.5

ALI-PUB-562211

ALI-PUB-562211